909904

10 3. . . .

011011110001001010000 . . 01010 011

1 1000100

1 0110111 0 1010000

00001010 00000011 encoded binary decimal

Figure 21.5 Part of an ASN.1 object identifier, shown in decimal, binary, and encoded form. The ASN.1 encoding uses multiple octets to encode integers greater than 127. A zero in the high-order bit of an octet marks the end of a subidentifier.