if 2 system 1 at 3 mib 1

sysObjectID 2 sysDescr 1 sysUpTime 3 ifNumber 1 ifTable 2

ifEntry 1 atTable 1

atEntry 1

Figure 21.2 Part of the conceptual naming tree for MIB variables. Dashed lines show the set of threads in the tree that define the lexically next item. The lexical ordering skips nodes that correspond to tables.