0 4 12 16 24 31

SOURCEADDRESS

DESTINATIONADDRESS

TCP LENGTH UNUSED(MUSTBE ZERO) NEXTHEADER

Figure 11.10 The 40 octets of the IPv6 pseudo-header used in TCP checksum computations.