Comparison of Domain-Profile and Single-Profile Methods

Accuracy vs Coverage Accuracy: Fraction of true-positives among all predicted functional associations Coverage: Number of functionally associated protein pairs that are identified by the algorithm

– Typeset by FoilTEX – 38